2003W 185.179 185.911 Laborbelegung

... geöffnet (7h-22h) ... Dienstzeit Techniker (9h-13h, 14h-17h) ... geschlossen 19 Plätze

2003-09-24 2003-09-26

2003-09-29 2003-10-01 2003-10-02 2003-10-03

2003-10-06 2003-10-07 2003-10-08 2003-10-09 2003-10-10

2003-10-13 2003-10-14 2003-10-15 2003-10-16 2003-10-17

2003-10-20 2003-10-21 2003-10-22 2003-10-23 2003-10-24

2003-10-27 2003-10-28 2003-10-29 2003-10-30 2003-10-31 2003-11-02

2003-11-03 2003-11-04 2003-11-05 2003-11-06 2003-11-07

2003-11-10 2003-11-11 2003-11-12 2003-11-13 2003-11-14

2003-11-17 2003-11-18 2003-11-19 2003-11-20 2003-11-21 2003-11-23

2003-11-24 2003-11-25 2003-11-26 2003-11-27 2003-11-28

2003-12-01 2003-12-02 2003-12-03 2003-12-04 2003-12-05

2003-12-08 2003-12-09 2003-12-10 2003-12-11